#
# ChangeLog for XIOS2/trunk/generic_testcase/param.def
#
# Generated by Trac 1.0.1
# 07/07/24 13:20:13

Wed, 06 Jul 2022 20:24:41 GMT ymipsl [2358]
	* XIOS2/branches (added)
	* XIOS2/dev (added)
	* XIOS2/dev/branch_openmp (copied)
	* XIOS2/trunk (copied)

	move xios2 branches
	YM


Mon, 20 Jul 2020 10:22:40 GMT yushan [1919]
	* XIOS/trunk/generic_testcase/context_atm.xml (modified)
	* XIOS/trunk/generic_testcase/iodef.xml (modified)
	* XIOS/trunk/generic_testcase/param.def (modified)
	* XIOS/trunk/src/node/extract_domain_to_axis.cpp (modified)

	trunk : bug in routine checkValid in extract_domain_to_axis


