#
# ChangeLog for XIOS2/dev/dev_ym/XIOS_COUPLING/xios_test_suite/COMPILE/compile_param_irene.def
#
# Generated by Trac 1.0.1
# 08/09/24 16:51:34

Wed, 06 Jul 2022 21:07:05 GMT ymipsl [2360]
	* XIOS2/dev/XIOS_DEV_CMIP6 (copied)
	* XIOS2/dev/XIOS_GRIB (copied)
	* XIOS2/dev/dev_oa (copied)
	* XIOS2/dev/dev_trunk_graph (copied)
	* XIOS2/dev/dev_trunk_omp (copied)
	* XIOS2/dev/dev_ym (copied)

	Move dev branches to XIOS2

	YM


Wed, 05 Jan 2022 08:23:54 GMT jderouillat [2278]
	* XIOS/dev/dev_ym/XIOS_COUPLING/xios_test_suite/ARCH/arch-X64_IRENE_GNU.fcm (modified)
	* XIOS/dev/dev_ym/XIOS_COUPLING/xios_test_suite/COMPILE/compile_param_irene.def (modified)

	Enable debug mode on the Irene test suite (compile step), add return ...


