#
# ChangeLog for XIOS/dev/dev_ym/XIOS_COUPLING/xios_test_suite/TEST_SUITE/test_memory/checkfile.def
#
# Generated by Trac 1.0.1
# 07/14/24 09:41:23

Fri, 07 Jan 2022 14:18:07 GMT jderouillat [2281]
	* XIOS/dev/dev_ym/XIOS_COUPLING/xios_test_suite/ARCH/arch-X64_IRENE.fcm (modified)
	* XIOS/dev/dev_ym/XIOS_COUPLING/xios_test_suite/TEST_SUITE/my_run.sh (modified)
	* XIOS/dev/dev_ym/XIOS_COUPLING/xios_test_suite/TEST_SUITE/run_test (modified)
	* XIOS/dev/dev_ym/XIOS_COUPLING/xios_test_suite/TEST_SUITE/run_test_irene (modified)
	* XIOS/dev/dev_ym/XIOS_COUPLING/xios_test_suite/TEST_SUITE/step1.py (modified)
	* XIOS/dev/dev_ym/XIOS_COUPLING/xios_test_suite/TEST_SUITE/step2.py (modified)
	* XIOS/dev/dev_ym/XIOS_COUPLING/xios_test_suite/TEST_SUITE/test_memory (added)
	* XIOS/dev/dev_ym/XIOS_COUPLING/xios_test_suite/TEST_SUITE/test_memory/checkfile.def (added)
	* XIOS/dev/dev_ym/XIOS_COUPLING/xios_test_suite/TEST_SUITE/test_memory/context_atm.xml (added)
	* XIOS/dev/dev_ym/XIOS_COUPLING/xios_test_suite/TEST_SUITE/test_memory/user_param_advanced.json (added)
	* XIOS/dev/dev_ym/XIOS_COUPLING/xios_test_suite/TEST_SUITE/test_memory/user_param_basic.json (added)
	* XIOS/dev/dev_ym/XIOS_COUPLING/xios_test_suite/generate_ref.sh (modified)

	Add tracking of the memory consumption in the test suite


