#
# ChangeLog for XIOS/dev/dev_oa/generic_testcase/param.def
#
# Generated by Trac 1.0.1
# 07/08/24 20:02:08

Wed, 07 Oct 2020 11:27:17 GMT oabramkina [1951]
	* XIOS/dev/dev_oa (copied)

	Creating a personal branch


Mon, 20 Jul 2020 10:22:40 GMT yushan [1919]
	* XIOS/trunk/generic_testcase/context_atm.xml (modified)
	* XIOS/trunk/generic_testcase/iodef.xml (modified)
	* XIOS/trunk/generic_testcase/param.def (modified)
	* XIOS/trunk/src/node/extract_domain_to_axis.cpp (modified)

	trunk : bug in routine checkValid in extract_domain_to_axis


