
#atm_output.nc
atm_output_reduction_1D.nc
atm_output_reduction_2D.nc
atm_output_reduction_3D.nc
atm_output_reduction_ref.nc
#atm_output_max.nc
#atm_output_min.nc
#atm_output_sum.nc
#atm_output_ave.nc
#atm_output_ensemble.nc
