#planetary radius : real (default=37122E6)
radius=6.0268000E7

# gravity : real (default=9.80616)
g=10.44

#planetary rotation rate (default=7.292E-5)
omega=0.165121E-03

# kappa=Rd/cpp (default=0.2857143)
kappa=0.2857143

# Heat capacity at constant pressure real (default=1004.70885)
cpp =  11500.

# Reference pressure : real (default=101325.)
preff=300000.

# length of the day (s) (default=86400)
day_length = 38052

# length of the year (s) (default=365.25*86400)
# -> year_length = 24430 *38052
year_length = 929610360

#starting day
start_day = 6695 

# Scale height of the atmosphere (m) : real (default=8000.)
scale_height=50000.

# Scale factor for small planet experiment : real (default=1.)
scale_factor=1.

# Precision of NetCDF output
netcdf_prec = double


daysec=38052
