#######################################################################
# parametres pour INCA
#######################################################################
#climatological=y --> use 10m wind from LMDZ, =n --> use 10m wind from output file
climatological=_AUTO_
#freq_write_chem --> write frequency for inca_inst and inca_avgr (86400 = 1/day)
freq_write_chem=_AUTO_
#choose if there is a feedback with the areosol effect
feedb=_AUTO_